Figure 3.8: Multiplicity distributions for the analyzed “min bias” data sets at 2,4,6 and 8A−GeV nominal incident beam energies. Also displayed are the cut boundaries between each of the cross section determined impact parameters. See appendix E for details on the cuts used.