)^{-2}

(GeV 2 T dN/dp

20

40

60

80

100

120

140

)^2

(GeV 2 Tp 0 0.0010.0020.0030.0040.0050.0060.0070.0080.0090.01

)^{-2}

(GeV 2 T dN/dp

0

50

100

150

200

250

300

350

)^2

(GeV 2 T p 0.0010.0020.0030.0040.0050.0060.0070.0080.009 0.01