raptight

Entries 8006

Mean -0.03939

RMS 0.4906

rapidity

-1.5 -1 -0.5 0 0.5 1 1.5 0

100

200

300

400

500

600 Rapidity

masstight Entries 7079 Mean 0.7522 RMS 0.1138 Underflow 0 Overflow 97 Integral 6982

2 GeV/c

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 0 100 200 300 400 500 600 700 800 masstight