Mass

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 0

100

200

300

400

500 Mass mass_{Entries 8301}

Mean 0.684 RMS 0.1843

Mass

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 0 20 40 60 80 100 120 140 160 180 200 masstight^{masstight}_{Entries 2005}

Mean 0.7143 RMS 0.1251

masstight

Mass

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

Efficiency

0

0.002

0.004

0.006

0.008

0.01

Efficiency as f(Mass)^{masseffhist}_{Entries 143673}

Mean 0.833 RMS 0.2209

Efficiency as f(Mass)

Delta Mass

-0.05-0.04-0.03-0.02-0.01 0 0.010.020.03 0.040.05 0 2000

4000

6000

8000

Mass Resolution deltamass_{Entries 143673}

Mean -5.52e-05 RMS 0.009149

Mass Resolution