GEANTrat

Entries 60188 / ndf

2χ 59.25 / 44 Prob 0.06209 p0 0.015± 0.236 p1 46.4± 1609 p2 34751± -8.496e+05 p3 9936404 ± 1.828e+08 p4 1197930880 ± -1.753e+10 p5 51196735488 ± 6.23e+11

)^2

(GeV 2 t ~ p

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.4

0.6

0.8

1

1.2

1.4

± ± ±

± ± ±

Int/Noint- GEANT STARrat Entries 117091 / ndf

2χ 154.3 / 44 Prob 1.11e-16 p0 0.00903 ± 0.08064 p1 32.7± 2008 p2 25314± -1.089e+06 p3 7345330 ± 2.392e+08 p4 894138816 ± -2.338e+10 p5 38500741120 ± 8.46e+11

)^2

(GeV 2 t ~ p

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.2

0.4

0.6

0.8

1

1.2 STARrat

±

± ± ±

Int/Noint STARlight

)^2

(GeV 2 t ~ p

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.01

0.011

0.012

0.013

0.014

0.015

Inteff

Entries 60188

Efficiency tp1_{Entries 1176}

Mean 0.002936 RMS 0.002246 Underflow 0 Overflow 0 Integral 1176 / ndf

2χ 46.23 / 47 Prob 0.5045 p0 3.20±

69.67 p1 12.1±

290.6 p2 0.1062 ± 0.9034

)^2

(GeV 2 t ~ p

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

)^{-2} dN/dt (GeV

0 10 20 30 40 50 60 70 80 tp1 Entries 1176

±

tbg1

Entries 8

Mean 0.004776

RMS 0.002977

Underflow 0

Overflow 0

Integral 8

t (uncorrected)

tcorr Entries 1176 / ndf

2χ 44.41 / 47 Prob 0.5803 p0 306.6 ± 6536 p1 12.4± 301.5 p2 0.0703 ± 0.9173

)^2

(GeV 2 t ~ p

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

)^{-2} dN/dt (GeV

0 1000

2000

3000

4000

5000

6000

7000 ± ±

t (Eff. Corr.)