0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 Int/Noint- GEANT

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.4

0.6

0.8

1

1.2

Int/Noint STARlight

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.007

0.0075

0.008

0.0085

0.009

0.0095

0.01

0.0105

Efficiency

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0 10 20 30 40 50 60 70 80 t (uncorrected)

t 0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0

2000

4000

6000

8000

10000

t (Eff. Corr.)