GEANTrat

Entries 65663 / ndf

2χ 60.96 / 44 Prob 0.04589 p0 0.0± 280.4 p1 0.00±

-23.36 p2 0.0000 ± 0.7757 p3 0.00000 ± -0.01279 p4 0.0000000 ± 0.0001047 p5 2.205e-11 ± -3.398e-07

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

± ± ± ±

± ± ± ±

Int/Noint- GEANT STARrat Entries 117368 / ndf

2χ 127.7 / 44 Prob 1.433e-11 p0 0.0± 507.2 p1 0.00±

-41.81 p2 0.000±

1.371 p3 0.00000 ± -0.02231 p4 0.00000 ± 0.00018 p5 1.634e-11 ± -5.764e-07

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 STARrat

± ± ±

Int/Noint STARlight

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.035

0.04

0.045

0.05

0.055

Inteff

Entries 65663 nointefficiency intefficiency

Efficiency tp1

Entries 3805 / ndf

2χ 73.56 / 47 Prob 0.007925 p0 6.3± 259.9 p1 6.8± 335.1 p2 0.1544 ± 0.7174

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0

50

100

150

200

250 tp1

±

t (uncorrected)

tcorr Entries 3805 / ndf

2χ 80.58 / 47 Prob 0.001662 p0 196.5 ± 7870 p1 7.0± 357.7 p2 0.1142 ± 0.8381

t 0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0 1000

2000

3000

4000

5000

6000

7000

8000

± ±

t (Eff. Corr.)