GEANTrat

Entries 54432 / ndf

2χ 47.46 / 45 Prob 0.3726 p1 0.05±

-84.91 p2 0.001±

5.965 p3 0.0000 ± -0.1532 p4 0.000000 ± 0.001723 p5 1.801e-09 ± -7.154e-06

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.6

0.8

1

1.2

1.4

± ± ± ± ± ±

Int/Noint- GEANT STARrat Entries 152639 / ndf

2χ 112.1 / 45 Prob 1.537e-08 p1 0.0±

-134.9 p2 0.001±

9.335 p3 0.0000 ± -0.2371 p4 0.000000 ± 0.002637 p5 1.021e-09 ± -1.083e-05

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.4

0.6

0.8

1

1.2

1.4 STARrat

± ± ±

Int/Noint STARlight

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.005

0.0055

0.006

0.0065

0.007

0.0075 Inteff

Entries 54432 nointefficiency intefficiency

Efficiency tp2

Entries 745 / ndf

2χ 78.12 / 47 Prob 0.002926 p0 2.41± 41.66 p1 15.1± 295 p2 0.1779 ± 0.8963

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0 5 10 15 20 25 30 35 40 45 tp2

±

t (uncorrected)

tcorr Entries 745 / ndf

2χ 80.18 / 47 Prob 0.001821 p0 487.0 ± 8330 p1 15.2± 318.8 p2 0.1095 ± 0.9275

)^2 t(GeV

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

)^{-2} dN/dt (GeV

0

2000

4000

6000

8000

10000

± ±

Total Fit