GEANTrat

Entries 88565 / ndf

2χ 56.76 / 45 Prob 0.1123 p1 0.0±

-111.3 p2 0.0± 7.7 p3 0.0000 ± -0.1955 p4 0.000000 ± 0.002177 p5 1.365e-09 ± -8.959e-06

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0.4

0.6

0.8

1

1.2

1.4

± ± ± ± ± ±

Int/Noint- GEANT STARrat Entries 166162 / ndf

2χ 122 / 45 Prob 3.04e-10 p1 0.0±

-154.2 p2 0.00±

10.59 p3 0.0000 ± -0.2673 p4 0.000000 ± 0.002957 p5 9.312e-10 ± -1.209e-05

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.4

0.6

0.8

1

1.2

1.4 STARrat

± ± ±

Int/Noint STARlight

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.007

0.0075

0.008

0.0085

0.009

0.0095

0.01

0.0105 Inteff

Entries 88565 nointefficiency intefficiency

Efficiency tp1

Entries 1176 / ndf

2χ 49.07 / 47 Prob 0.39 p0 3.11± 68.58 p1 11.9± 285.9 p2 0.1167 ± 0.9607

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0 10 20 30 40 50 60 70 80 tp1

±

t (uncorrected)

tcorr Entries 1176 / ndf

2χ 44.2 / 47 Prob 0.589 p0 431.4 ± 9382 p1 12.0± 304 p2 0.0758 ± 0.9539

)^2 t(GeV

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

)^{-2} dN/dt (GeV

0

2000

4000

6000

8000

10000 ± ±

Total Fit