0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 Int/Noint- GEANT

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 Int/Noint STARlight

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.013

0.014

0.015

0.016

0.017

0.018

0.019

0.02

nointefficiency intefficiency

Efficiency

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0 20 40 60 80 100 120 140 t (uncorrected)

)^2 t(GeV

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

)^{-2} dN/dt (GeV

0

2000

4000

6000

8000

10000

Total Fit