GEANTrat

Entries 65663 / ndf

2χ 86.42 / 45 Prob 0.0002017 p1 0.04±

-89.33 p2 0.00± 6.02 p3 0.0000 ± -0.1485 p4 0.000000 ± 0.001606 p5 1.756e-09 ± -6.423e-06

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

± ± ± ± ± ±

Int/Noint- GEANT STARrat Entries 117368 / ndf

2χ 246.8 / 45 Prob 0 p1 0.0±

-127.2 p2 0.001±

8.469 p3 0.0000 ± -0.2072 p4 0.000000 ± 0.002224 p5 1.307e-09 ± -8.839e-06

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Ratio

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 STARrat

± ± ±

Int/Noint STARlight

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

0.035

0.04

0.045

0.05

0.055

Inteff

Entries 65663 nointefficiency intefficiency

Efficiency tp1

Entries 3805 / ndf

2χ 77.53 / 47 Prob 0.003341 p0 6.3± 260.4 p1 6.8± 336.1 p2 0.160 ± 0.672

t ~ p_T^2

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01 dN/dt

0

50

100

150

200

250 tp1

±

t (uncorrected)

tcorr Entries 3805 / ndf

2χ 87.73 / 47 Prob 0.0002899 p0 198.7 ± 7877 p1 7.1± 358.2 p2 0.1204 ± 0.8223

)^2 t(GeV

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

)^{-2} dN/dt (GeV

0 1000

2000

3000

4000

5000

6000

7000

8000

± ±

Total Fit